SPECsfs97 Result

© Copyright 1997-2007 Standard Performance Evaluation Corporation

SPECsfs97_R1.v3=

359416 Ops/Sec (Overall Response Time = 2.16 msec)

Throughput Average Response (ops/sec) (msec)

Average Response Time (msec)

Throughput (ops/sec)

Overall Response Time= 2.16 msec

CPU, Memory and Power Server Software Network Subsystem

Server Tuning

Disk Subsystem

Page 1 of 2

SPECsfs97 Result

© Copyright 1997-2007 Standard Performance Evaluation Corporation

SPECsfs97_R1.v3=

359416 Ops/Sec (Overall Response Time = 2.16 msec)

Load Generator (LG) Configuration

Testbed Configuration

Notes/Tuning Information

Page 2 of 2