For more Information Contact

SPEC 10754 Ambassador Drive, Suite 201 Manassas, VA 20109-2626

(703) 331-0180 info@spec.org http://www.spec.org

SPECweb99 Result

© Copyright 1999, Standard Performance Evaluation Corporation

Some Texas Company: Kowabunga 2000 Software House of Horrors: WebServer 12.0

SPECweb99 = 100

Test Date: Tested By:

Dec-1901 Some Texas Company

Hardware Avail: Dec-1999 OS Avail: Jun-1997 HTTP Software Avail: Jan-2000 Sup. Software Avail: Jan-2001 SPEC license #: -1

Hardware

Vendor: Some Texas Company Model: Kowabunga 2000 Processor: 60 Hz PDP-11 # Processors: 13 Primary Cache: 16KBI+16KBD on chip Secondary Cache: 1MB(I+D) off chip Other Cache: 16MB(I+D) off chip per CPU pair Memory: 7 GB Disk Subsystem: 3 CDRW, 10 9GB SCSI AB-CD01 Disk Controllers: 1 IDE KURU-2000 Other Hardware: 1 Everready Bunny

Software

Operating System: MS-DOS 2.1 File System: NFS Other Software: Quake II

HTTP Software

Vendor: Software House of Horrors HTTP Software: WebServer 12.0 API: Fast CGI Server Cache: WebSpeedup 0.12 Log Mode: Uncommon Log Format

Test Sponsor

Test Date: Dec-1901 Tested By: Some Texas Company SPEC License: -1

Network

# of Controllers: 100 Network Controllers: 3 Proteon ISA Microbit & 97 MultiCom Ethernet # of Nets: 100 Type of Nets: 3 Microbit & 97 Ethernet Network Speed: 1Mb/s & 10Mb/s MSL (sec): 30 (Non RFC1122) Time-Wait (sec): 60 (Non RFC1122) MTU: 1500

Clients

# of Clients: 1 Model: PackardBell 286i Processor: 1.28Mhz 8088+ # of Processors: 1 Memory: 64KB Network Controller: Hayes Internal Operating System: Disk O.S. Compiler: TurboPascal

Notes/Tuning Information

SUT Notes

I overclocked this machine I learned how to do it on the Internet

Operating System Notes

Tuning parameters: superboost=1 megacache_size=9009009009

Other Notes

I’d like to teach the world to sing