Standard Performance Evaluation Corporation info@spec.org http://www.spec.org spec OMPM2001 Result

Copyright ©1999-2002, Standard Performance Evaluation Corporation

Sun Microsystems Inc. Sun Enterprise 4500

SPECompMpeak2001 = SPECompMbase2001 = -- 1825

SPEC license #:HPG0010 Tested by: Sun Microsystems Test site: Test date: Jun-2001 Hardware Avail:Dec-1998 Software Avail: Jul-2001

Benchmark

Reference

Time

Base Runtime

Base Ratio

Peak Runtime

Peak Ratio 1000 2000 3000 4000

310.wupwise_m 6000 3118 1924

312.swim_m 6000 2878 2085

314.mgrid_m 7300 3119 2340

316.applu_m 4000 2013 1987

318.galgel_m 5100 1723 2961

320.equake_m 2600 1602 1622

324.apsi_m 3400 2609 1303

326.gafort_m 8700 4310 2019

328.fma3d_m 4600 3216 1430

330.art_m 6400 4487 1426

332.ammp_m 7000 4503 1555

Hardware

CPU: UltraSPARC II CPU MHz: 400MHz FPU: Integrated CPU(s) enabled: 8 CPU(s) orderable: 1-14 Primary Cache: 16KBI+16KBD on chip Secondary Cache: 4MB(I+D) off chip L3 Cache: -- Other Cache: None Memory: 8GB Disk Subsystem: 18GB

Other Hardware:

Software

OpenMP Threads: 8 Parallel: -- Operating System: Solaris 8 update 1 Compiler: Forte Developer 6 update 2

File System: UFS System State: Multi User

Notes/Tuning Information

 Base:
     C: -fast -xopenmp -xalias_level=strong
     f90: -fast -stackvar -openmp