Standard Performance Evaluation Corporation info@spec.org http://www.spec.org spec OMPM2001 Result

Copyright ©1999-2002, Standard Performance Evaluation Corporation

Hewlett-Packard Company hp server rp7410 (750MHz PA-8700)

SPECompMpeak2001 = SPECompMbase2001 = -- 3748

SPEC license #:HPG2116 Tested by: Hewlett-Packard Company Test site: Richardson, Texas Test date: Feb-2002 Hardware Avail:Mar-2002 Software Avail:Mar-2002

Benchmark

Reference

Time

Base Runtime

Base Ratio

Peak Runtime

Peak Ratio 2000 4000 6000 8000

310.wupwise_m 6000 1394 4304

312.swim_m 6000 1314 4567

314.mgrid_m 7300 1791 4077

316.applu_m 4000 834 4797

318.galgel_m 5100 1791 2847

320.equake_m 2600 676 3847

324.apsi_m 3400 802 4240

326.gafort_m 8700 2107 4129

328.fma3d_m 4600 1674 2747

330.art_m 6400 1498 4272

332.ammp_m 7000 2956 2368

Hardware

CPU: PA-8700 CPU MHz: 750 FPU: Integrated CPU(s) enabled: 8 CPU(s) orderable: 2 to 8 by 2 Primary Cache: 0.75MB(I) + 1.5MB(D) on chip Secondary Cache: None L3 Cache: None Other Cache: None Memory: 16GB (32x512MB DIMMs) Disk Subsystem: 2x18 GB SCSI Other Hardware: --

Software

OpenMP Threads: 8 Parallel: -- Operating System: HP-UX 11i TCOE B.11.11.0203 Compiler: HP C/ANSI C Compiler v11.11.04 HP Fortran 90 Compiler v2.5.10 PHCO_25226 Initialised TLS patch PHSS_24304 ld(1) and linker tools patch PHSS_24382 LIBCL patch PHSS_25029 CPSlib patch PHSS_25985 ANSI C compiler patch PHSS_25986 +O4/PBO compiler patch PHSS_26067 Fortran90 compiler patch

File System: VxFS System State: Multi-user

Notes/Tuning Information

User environment:
   OMP_NUM_THREADS=8
   CPS_STACK_SIZE=128
Kernel Paramters (/stand/system):
   maxdsiz         0X80000000
   maxdsiz_64bit   0X400000000
   maxssiz         0X10000000
   maxssiz_64bit   0X40000000
   maxtsiz         0X4000000
   maxtsiz_64bit   0X40000000
Base:
   All use   -Wl,-aarchive
   F90 +O3 +Oall +Onofltacc +Oinfo +Oopenmp -Wl,+FPD -N
   cc   +Oall  +DA2.0W +Oopenmp +Oinfo
   cc_pass1  +I
   cc_pass2  +P +Ostatic_prediction
Portability: 318.galgel_m: +source=fixed +extend_source