Page 1 Standard Performance Evaluation Corporation (info@spec.org) https://www.spec.org/ spec^® SPEC CPU

®2017 Integer Rate Result

Copyright 2017-2022 Standard Performance Evaluation Corporation

Alibaba Cloud

(2.75GHz, T-Head Yitian 710)

Alibaba Cloud Server Panjiu-M Series SPECrate®2017_int_peak =

SPECrate^®2017_int_base =

CPU2017 License: 9070 Test Date: Jun-2022 Test Sponsor: Alibaba Cloud Hardware Availability: Sep-2022 Tested by: Alibaba Cloud Software Availability: May-2022

500.perlbench_r

502.gcc_r

505.mcf_r

520.omnetpp_r

523.xalancbmk_r

525.x264_r

531.deepsjeng_r

541.leela_r

548.exchange2_r

557.xz_r

Copies

Hardware

CPU Name: T-Head Yitian 710 Max MHz: 2750 Nominal: 2750 Enabled: 128 cores, 1 chip Orderable: 1 chips Cache L1: 64 KB I + 64 KB D on chip per core L2: 1 MB I+D on chip per core L3: 64 MB I+D on chip per die (128 MB per chip) Other: None Memory: 512 GB (8 x 64 GB 2Rx4 PC5-4800B-R) Storage: 1 x 240 GB SATA SSD Other: None

Software

OS: Anolis OS release 8.6 5.10.84-10.64k.al8.aarch64 Compiler: C/C++/Fortran: Version 10.2.1 of Red Hat GCC Parallel: No Firmware: Version 1.2.M1.AL.E.128.91 released Jun-2022 File System: xfs System State: Run level 3 (multi-user) Base Pointers: 64-bit Peak Pointers: Not Applicable Other: Jemalloc memory allocator library v5.2.1 Power Management: OS set to prefer performance at the cost of additional power usage

Non-Compliant

SPEC has determined that this result does not comply with the SPEC OSG Guidelines for General Availability and the SPEC CPU 2017 run and reporting rules. Specifically, the submitter has notified SPEC that General Availability requirements were not met.

Page 2 Standard Performance Evaluation Corporation (info@spec.org) https://www.spec.org/ spec^® SPEC CPU

®2017 Integer Rate Result

Copyright 2017-2022 Standard Performance Evaluation Corporation

Alibaba Cloud

(2.75GHz, T-Head Yitian 710)

Alibaba Cloud Server Panjiu-M Series SPECrate®2017_int_peak =

SPECrate^®2017_int_base =

CPU2017 License: 9070 Test Date: Jun-2022 Test Sponsor: Alibaba Cloud Hardware Availability: Sep-2022 Tested by: Alibaba Cloud Software Availability: May-2022

Results Table

Benchmark Copies Seconds Ratio Seconds Ratio Seconds Ratio

Base Copies Seconds Ratio Seconds Ratio Seconds Ratio

Peak

500.perlbench_r NC NC NC NC NC NC NC NC NC NC NC NC NC NC 502.gcc_r NC NC NC NC NC NC NC NC NC NC NC NC NC NC 505.mcf_r NC NC NC NC NC NC NC NC NC NC NC NC NC NC 520.omnetpp_r NC NC NC NC NC NC NC NC NC NC NC NC NC NC 523.xalancbmk_r NC NC NC NC NC NC NC NC NC NC NC NC NC NC 525.x264_r NC NC NC NC NC NC NC NC NC NC NC NC NC NC 531.deepsjeng_r NC NC NC NC NC NC NC NC NC NC NC NC NC NC 541.leela_r NC NC NC NC NC NC NC NC NC NC NC NC NC NC 548.exchange2_r NC NC NC NC NC NC NC NC NC NC NC NC NC NC 557.xz_r NC NC NC NC NC NC NC NC NC NC NC NC NC NC SPECrate^®2017_int_base = SPECrate^®2017_int_peak =

Results appear in the order in which they were run. Bold underlined text indicates a median measurement.

Compiler Notes

 Binaries compiled on a PanJiu-M system with 1 x T-Head YiTian710 chip + 512 GB memory using Anolis 8.6

Submit Notes

 The config file option ’submit’ was used.
 ’numactl’ was used to bind copies to the cores.

Operating System Notes

 ’ulimit -s unlimited’ was used to set environment stack size
 Set dirty_ratio=8 to limit dirty cache to 8% of memory
 i.e. echo 8 | sudo tee /proc/sys/vm/dirty_ratio
 Set swappiness=1 to swap only if necessary
 i.e. echo 1 | sudo tee /proc/sys/vm/swappiness
 Set zone_reclaim_mode=1 to free local node memory and avoid remote memory
 i.e. echo 1 | sudo tee /proc/sys/vm/zone_reclaim_mode
 Set drop_caches=3 to reset caches before invoking runcpu
 i.e. echo 3 | sudo tee /proc/sys/vm/drop_caches
 Set numa_balancing=0 to disable automatic numa balancing

(Continued on next page)

Non-Compliant

SPEC has determined that this result does not comply with the SPEC OSG Guidelines for General Availability and the SPEC CPU 2017 run and reporting rules. Specifically, the submitter has notified SPEC that General Availability requirements were not met.

Page 3 Standard Performance Evaluation Corporation (info@spec.org) https://www.spec.org/ spec^® SPEC CPU

®2017 Integer Rate Result

Copyright 2017-2022 Standard Performance Evaluation Corporation

Alibaba Cloud

(2.75GHz, T-Head Yitian 710)

Alibaba Cloud Server Panjiu-M Series SPECrate®2017_int_peak =

SPECrate^®2017_int_base =

CPU2017 License: 9070 Test Date: Jun-2022 Test Sponsor: Alibaba Cloud Hardware Availability: Sep-2022 Tested by: Alibaba Cloud Software Availability: May-2022

Operating System Notes (Continued)

 i.e. echo 0 | sudo tee /proc/sys/kernel/numa_balancing
 Switch off all ktune and tuned settings
 i.e. sudo tuned-adm off

 Transparent huge pages set to ’never’ to prevent applications from allocating more memory resources than

 necessary.
 i.e. sudo bash -c "echo never > /sys/kernel/mm/transparent_hugepage/enabled"

Environment Variables Notes

Environment variables set by runcpu before the start of the run:
LD_LIBRARY_PATH =
     "/home/jemalloc-5.2.1/lib:/opt/rh/devtoolset-10/root/usr/bin//lib64/:/op
     t/rh/devtoolset-10/root/usr/bin//lib/:/opt/rh/devtoolset-10/root/usr/lib
     64:/opt/rh/devtoolset-10/root/usr/lib:/opt/rh/devtoolset-10/root/usr/lib
     64/dyninst:/opt/rh/devtoolset-10/root/usr/lib/dyninst:/opt/rh/devtoolset
     -10/root/usr/lib64:/opt/rh/devtoolset-10/root/usr/lib"

General Notes

 Jemalloc v5.2.1 is available via
 https://github.com/jemalloc/jemalloc/releases/download/5.2.1/jemalloc-5.2.1.tar.bz2
 It was built on 5.10.84-10.64k.al8.aarch64 GCC10.2.1 with configure options
 --prefix=/root/jemalloc/install --with-lg-quantum=3

 NA:  The test sponsor attests, as of date of publication, that CVE-2017-5715 (Spectre variant 2)
      is mitigated in the system as tested and documented.
 Yes: The test sponsor attests, as of date of publication, that CVE-2017-5753 (Spectre variant 1)
      is mitigated in the system as tested and documented.
 NA:  The test sponsor attests, as of date of publication, that CVE-2017-5754 (Meltdown)
      is mitigated in the system as tested and documented.

Platform Notes

BIOS settings:
platform configure > memory configure > Enable NUMA Mode >  Set to SubNuma mode
Yitian710 NUMA Control specifies the number of desired NUMA nodes per chip (default: 2-NUMA nodes).
SubNuma enable Setting: Dividing the chip into separate nodes may improve latency to the last

(Continued on next page)

Non-Compliant

SPEC has determined that this result does not comply with the SPEC OSG Guidelines for General Availability and the SPEC CPU 2017 run and reporting rules. Specifically, the submitter has notified SPEC that General Availability requirements were not met.

Page 4 Standard Performance Evaluation Corporation (info@spec.org) https://www.spec.org/ spec^® SPEC CPU

®2017 Integer Rate Result

Copyright 2017-2022 Standard Performance Evaluation Corporation

Alibaba Cloud

(2.75GHz, T-Head Yitian 710)

Alibaba Cloud Server Panjiu-M Series SPECrate®2017_int_peak =

SPECrate^®2017_int_base =

CPU2017 License: 9070 Test Date: Jun-2022 Test Sponsor: Alibaba Cloud Hardware Availability: Sep-2022 Tested by: Alibaba Cloud Software Availability: May-2022

Platform Notes (Continued)

level cache and main memory which may benefit overall performance for NUMA-aware operating systems
and workloads.  Setting to 4-Numa nodes Per chip.
DDR MPAM setting : (Default: Enabled)
MPAM is a family of QoS/SLA services implemented through monitoring and partitioning of all
the memory system components.  It is beneficial for systems hosting VMs, and servers with a
mix of background and demand processes requiring fair-share scheduling.
Set to "disable" to provide best memory bandwidth.

 Sysinfo program /home/cpu2017/bin/sysinfo
 Rev: r6622 of 2021-04-07 982a61ec0915b55891ef0e16acafc64d
 running on localhost.localdomain Fri Jun 10 17:50:12 2022

 SUT (System Under Test) info as seen by some common utilities.
 For more information on this section, see
    https://www.spec.org/cpu2017/Docs/config.html#sysinfo

 From /proc/cpuinfo
 *
 * Did not identify cpu model.  If you would
 * like to write your own sysinfo program, see
 * www.spec.org/cpu2017/config.html#sysinfo
 *
 *
 * 0 "physical id" tags found.  Perhaps this is an older system,
 * or a virtualized system.  Not attempting to guess how to
 * count chips/cores for this system.
 *
       128 "processors"
    cores, siblings (Caution: counting these is hw and system dependent. The following
    excerpts from /proc/cpuinfo might not be reliable.  Use with caution.)

 From lscpu from util-linux 2.32.1:
      Architecture:        aarch64
      Byte Order:          Little Endian
      CPU(s):              128
      On-line CPU(s) list: 0-127
      Thread(s) per core:  1
      Core(s) per socket:  128
      Socket(s):           1
      NUMA node(s):        4

(Continued on next page)

Non-Compliant

SPEC has determined that this result does not comply with the SPEC OSG Guidelines for General Availability and the SPEC CPU 2017 run and reporting rules. Specifically, the submitter has notified SPEC that General Availability requirements were not met.

Page 5 Standard Performance Evaluation Corporation (info@spec.org) https://www.spec.org/ spec^® SPEC CPU

®2017 Integer Rate Result

Copyright 2017-2022 Standard Performance Evaluation Corporation

Alibaba Cloud

(2.75GHz, T-Head Yitian 710)

Alibaba Cloud Server Panjiu-M Series SPECrate®2017_int_peak =

SPECrate^®2017_int_base =

CPU2017 License: 9070 Test Date: Jun-2022 Test Sponsor: Alibaba Cloud Hardware Availability: Sep-2022 Tested by: Alibaba Cloud Software Availability: May-2022

Platform Notes (Continued)

      Vendor ID:           ARM
      BIOS Vendor ID:      Alibaba
      Model:               0
      BIOS Model name:     To.Be.Filled.By.PTG
      Stepping:            r0p0
      BogoMIPS:            100.00
      L1d cache:           64K
      L1i cache:           64K
      L2 cache:            1024K
      L3 cache:            65536K
      NUMA node0 CPU(s):   0-31
      NUMA node1 CPU(s):   32-63
      NUMA node2 CPU(s):   64-95
      NUMA node3 CPU(s):   96-127
      Flags:               fp asimd evtstrm aes pmull sha1 sha2 crc32 atomics fphp asimdhp
      cpuid asimdrdm jscvt fcma lrcpc dcpop sha3 sm3 sm4 asimddp sha512 sve asimdfhm dit
      uscat ilrcpc flagm ssbs sb dcpodp sve2 sveaes svepmull svebitperm svesha3 svesm4
      flagm2 frint svei8mm svebf16 i8mm bf16 dgh

 From numactl --hardware
 WARNING: a numactl ’node’ might or might not correspond to a physical chip.
   available: 4 nodes (0-3)
   node 0 cpus: 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24 25 26 27
   28 29 30 31
   node 0 size: 130807 MB
   node 0 free: 121857 MB
   node 1 cpus: 32 33 34 35 36 37 38 39 40 41 42 43 44 45 46 47 48 49 50 51 52 53 54 55 56
   57 58 59 60 61 62 63
   node 1 size: 130923 MB
   node 1 free: 121267 MB
   node 2 cpus: 64 65 66 67 68 69 70 71 72 73 74 75 76 77 78 79 80 81 82 83 84 85 86 87 88
   89 90 91 92 93 94 95
   node 2 size: 130923 MB
   node 2 free: 111448 MB
   node 3 cpus: 96 97 98 99 100 101 102 103 104 105 106 107 108 109 110 111 112 113 114
   115 116 117 118 119 120 121 122 123 124 125 126 127
   node 3 size: 130859 MB
   node 3 free: 120581 MB
   node distances:
   node   0   1   2   3

(Continued on next page)

Non-Compliant

SPEC has determined that this result does not comply with the SPEC OSG Guidelines for General Availability and the SPEC CPU 2017 run and reporting rules. Specifically, the submitter has notified SPEC that General Availability requirements were not met.

Page 6 Standard Performance Evaluation Corporation (info@spec.org) https://www.spec.org/ spec^® SPEC CPU

®2017 Integer Rate Result

Copyright 2017-2022 Standard Performance Evaluation Corporation

Alibaba Cloud

(2.75GHz, T-Head Yitian 710)

Alibaba Cloud Server Panjiu-M Series SPECrate®2017_int_peak =

SPECrate^®2017_int_base =

CPU2017 License: 9070 Test Date: Jun-2022 Test Sponsor: Alibaba Cloud Hardware Availability: Sep-2022 Tested by: Alibaba Cloud Software Availability: May-2022

Platform Notes (Continued)

     0:  10  15  40  40
     1:  15  10  40  40
     2:  40  40  10  15
     3:  40  40  15  10

 From /proc/meminfo
    MemTotal:       536078144 kB
    HugePages_Total:       0
    Hugepagesize:     524288 kB

 /sbin/tuned-adm active
     Current active profile: virtual-guest

 From /etc/*release* /etc/*version*
    anolis-release: Anolis OS release 8.6
    os-release:
       NAME="Anolis OS"
       VERSION="8.6"
       ID="anolis"
       ID_LIKE="rhel fedora centos"
       VERSION_ID="8.6"
       PLATFORM_ID="platform:an8"
       PRETTY_NAME="Anolis OS 8.6"
       ANSI_COLOR="0;31"
    redhat-release: Anolis OS release 8.6
    system-release: Anolis OS release 8.6

 uname -a:
    Linux localhost.localdomain 5.10.84-10.64k.al8.aarch64 #1 SMP Wed Jan 26 10:20:10 CST
    2022 aarch64 aarch64 aarch64 GNU/Linux

 Kernel self-reported vulnerability status:

 CVE-2018-12207 (iTLB Multihit):                        Not affected
 CVE-2018-3620 (L1 Terminal Fault):                     Not affected
 Microarchitectural Data Sampling:                      Not affected
 CVE-2017-5754 (Meltdown):                              Not affected
 CVE-2018-3639 (Speculative Store Bypass):              Mitigation: Speculative Store
                                                        Bypass disabled via prctl
 CVE-2017-5753 (Spectre variant 1):                     Mitigation: __user pointer

(Continued on next page)

Non-Compliant

SPEC has determined that this result does not comply with the SPEC OSG Guidelines for General Availability and the SPEC CPU 2017 run and reporting rules. Specifically, the submitter has notified SPEC that General Availability requirements were not met.

Page 7 Standard Performance Evaluation Corporation (info@spec.org) https://www.spec.org/ spec^® SPEC CPU

®2017 Integer Rate Result

Copyright 2017-2022 Standard Performance Evaluation Corporation

Alibaba Cloud

(2.75GHz, T-Head Yitian 710)

Alibaba Cloud Server Panjiu-M Series SPECrate®2017_int_peak =

SPECrate^®2017_int_base =

CPU2017 License: 9070 Test Date: Jun-2022 Test Sponsor: Alibaba Cloud Hardware Availability: Sep-2022 Tested by: Alibaba Cloud Software Availability: May-2022

Platform Notes (Continued)

                                                        sanitization
 CVE-2017-5715 (Spectre variant 2):                     Not affected
 CVE-2020-0543 (Special Register Buffer Data Sampling): Not affected
 CVE-2019-11135 (TSX Asynchronous Abort):               Not affected

 run-level 3 Sep 29 19:51

 SPEC is set to: /home/cpu2017
    Filesystem          Type  Size  Used Avail Use% Mounted on
    /dev/mapper/ao-home xfs   148G   41G  108G  28% /home

 From /sys/devices/virtual/dmi/id
     Vendor:         AlibabaCloud
     Product:        AliServer-Xuanwu2.0AM-02-1UC1P-5B
     Product Family: TO.Be.Filled.By.PTG

 Additional information from dmidecode 3.3 follows.  WARNING: Use caution when you
 interpret this section. The ’dmidecode’ program reads system data which is "intended to
 allow hardware to be accurately determined", but the intent may not be met, as there are
 frequent changes to hardware, firmware, and the "DMTF SMBIOS" standard.
   Memory:
     7x Hynix HMCG94MEBRA109N 64 GB 2 rank 4800
     1x Hynix HMCG94MEBRA123N 64 GB 2 rank 4800

 BIOS:
    BIOS Vendor:       Alibaba
    BIOS Version:      1.2.M1.AL.E.128.91
    BIOS Date:         06/02/2022

 (End of data from sysinfo program)

Compiler Version Notes

==============================================================================
C       | 500.perlbench_r(base) 502.gcc_r(base) 505.mcf_r(base)
        | 525.x264_r(base) 557.xz_r(base)
------------------------------------------------------------------------------
gcc (GCC) 10.2.1 20210130 (Red Hat 10.2.1-11)
Copyright (C) 2020 Free Software Foundation, Inc.

(Continued on next page)

Non-Compliant

SPEC has determined that this result does not comply with the SPEC OSG Guidelines for General Availability and the SPEC CPU 2017 run and reporting rules. Specifically, the submitter has notified SPEC that General Availability requirements were not met.

Page 8 Standard Performance Evaluation Corporation (info@spec.org) https://www.spec.org/ spec^® SPEC CPU

®2017 Integer Rate Result

Copyright 2017-2022 Standard Performance Evaluation Corporation

Alibaba Cloud

(2.75GHz, T-Head Yitian 710)

Alibaba Cloud Server Panjiu-M Series SPECrate®2017_int_peak =

SPECrate^®2017_int_base =

CPU2017 License: 9070 Test Date: Jun-2022 Test Sponsor: Alibaba Cloud Hardware Availability: Sep-2022 Tested by: Alibaba Cloud Software Availability: May-2022

Compiler Version Notes (Continued)

This is free software; see the source for copying conditions.  There is NO
warranty; not even for MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.
------------------------------------------------------------------------------

==============================================================================
C++     | 520.omnetpp_r(base) 523.xalancbmk_r(base) 531.deepsjeng_r(base)
        | 541.leela_r(base)
------------------------------------------------------------------------------
g++ (GCC) 10.2.1 20210130 (Red Hat 10.2.1-11)
Copyright (C) 2020 Free Software Foundation, Inc.
This is free software; see the source for copying conditions.  There is NO
warranty; not even for MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.
------------------------------------------------------------------------------

==============================================================================
Fortran | 548.exchange2_r(base)
------------------------------------------------------------------------------
GNU Fortran (GCC) 10.2.1 20210130 (Red Hat 10.2.1-11)
Copyright (C) 2020 Free Software Foundation, Inc.
This is free software; see the source for copying conditions.  There is NO
warranty; not even for MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.
------------------------------------------------------------------------------

Base Compiler Invocation

C benchmarks:

gcc

C++ benchmarks:

g++

Fortran benchmarks:

gfortran

Non-Compliant

SPEC has determined that this result does not comply with the SPEC OSG Guidelines for General Availability and the SPEC CPU 2017 run and reporting rules. Specifically, the submitter has notified SPEC that General Availability requirements were not met.

Page 9 Standard Performance Evaluation Corporation (info@spec.org) https://www.spec.org/ spec^® SPEC CPU

®2017 Integer Rate Result

Copyright 2017-2022 Standard Performance Evaluation Corporation

Alibaba Cloud

(2.75GHz, T-Head Yitian 710)

Alibaba Cloud Server Panjiu-M Series SPECrate®2017_int_peak =

SPECrate^®2017_int_base =

CPU2017 License: 9070 Test Date: Jun-2022 Test Sponsor: Alibaba Cloud Hardware Availability: Sep-2022 Tested by: Alibaba Cloud Software Availability: May-2022

Base Portability Flags

500.perlbench_r: -DSPEC_LINUX_AARCH64 -DSPEC_LP64 502.gcc_r: -DSPEC_LP64 505.mcf_r: -DSPEC_LP64 520.omnetpp_r: -DSPEC_LP64 523.xalancbmk_r: -DSPEC_LINUX -DSPEC_LP64 525.x264_r: -DSPEC_LP64 531.deepsjeng_r: -DSPEC_LP64 541.leela_r: -DSPEC_LP64 548.exchange2_r: -DSPEC_LP64 557.xz_r: -DSPEC_LP64

Base Optimization Flags

C benchmarks:

-mabi=lp64 -std=c99 -L/opt/rh/devtoolset-10/root/usr/bin//lib64
-L/opt/rh/devtoolset-10/root/usr/bin//lib -L/home/jemalloc-5.2.1/lib -g
-O3 -mcpu=neoverse-n1 -funroll-loops -flto=32
--param early-inlining-insns=96 --param max-inline-insns-auto=64
--param inline-unit-growth=96 -fgnu89-inline -ljemalloc

C++ benchmarks:

-mabi=lp64 -std=c++03 -L/opt/rh/devtoolset-10/root/usr/bin//lib64
-L/opt/rh/devtoolset-10/root/usr/bin//lib -L/home/jemalloc-5.2.1/lib -g
-O3 -mcpu=neoverse-n1 -funroll-loops -flto=32
--param early-inlining-insns=256 --param max-inline-insns-auto=128
--param inline-unit-growth=256 -ffinite-loops -ljemalloc

Fortran benchmarks:

-mabi=lp64 -L/opt/rh/devtoolset-10/root/usr/bin//lib64
-L/opt/rh/devtoolset-10/root/usr/bin//lib -L/home/jemalloc-5.2.1/lib -g
-O3 -mcpu=neoverse-n1 -funroll-loops -flto=32
--param ipa-cp-eval-threshold=1 --param ipa-cp-unit-growth=80
--param ipa-cp-max-recursive-depth=8 -fno-inline-functions-called-once
-fstack-arrays -flto-partition=one -ljemalloc

Non-Compliant

SPEC has determined that this result does not comply with the SPEC OSG Guidelines for General Availability and the SPEC CPU 2017 run and reporting rules. Specifically, the submitter has notified SPEC that General Availability requirements were not met.

Page 10 Standard Performance Evaluation Corporation (info@spec.org) https://www.spec.org/ spec^® SPEC CPU

®2017 Integer Rate Result

Copyright 2017-2022 Standard Performance Evaluation Corporation

Alibaba Cloud

(2.75GHz, T-Head Yitian 710)

Alibaba Cloud Server Panjiu-M Series SPECrate®2017_int_peak =

SPECrate^®2017_int_base =

CPU2017 License: 9070 Test Date: Jun-2022 Test Sponsor: Alibaba Cloud Hardware Availability: Sep-2022 Tested by: Alibaba Cloud Software Availability: May-2022

Base Other Flags

C benchmarks:

-fcommon -Wl,-Map,mapfile

C++ benchmarks:

-Wl,-Map,mapfile

Fortran benchmarks:

-Wl,-Map,mapfile

The flags file that was used to format this result can be browsed at

http://www.spec.org/cpu2017/flags/gcc.2021-07-21.html

You can also download the XML flags source by saving the following link:

http://www.spec.org/cpu2017/flags/gcc.2021-07-21.xml

Originally published on 2022-07-05.

Report generated on 2022-11-04 18:44:04 by CPU2017 PS formatter v6442.

Tested with SPEC CPU^®2017 v1.1.8 on 2022-06-10 17:50:11-0400.

For questions about this result, please contact the tester. For other inquiries, please contact info@spec.org.

names appearing in this result are trademarks or registered trademarks of their respective holders.

SPEC CPU and SPECrate are registered trademarks of the Standard Performance Evaluation Corporation. All other brand and product

Non-Compliant

SPEC has determined that this result does not comply with the SPEC OSG Guidelines for General Availability and the SPEC CPU 2017 run and reporting rules. Specifically, the submitter has notified SPEC that General Availability requirements were not met.